2.3 2.35 2.4 2.45 2.5 2.55 2.6 2.65 )^2c

) (GeV/ Ξπ(M 3.8 4.0 4.2 4.4 4.6 4.8 5.0^310×

2c Counts per 6 MeV/

ALICE

= 5.02 TeV NNs Pb, −p p^−π^−π^+π→Λ^−π^+π→ ^−Ξ^+π→ _c^0Ξ and charge conjugate c < 4 GeV/ Tp 2 <

2c 0.002) GeV/ ± = (2.471 μ (fixed) 2c = 8 MeV/ σ 181 ± S = 797

ALI-PUB-570987

ALI-PUB-570987